Notas de Automação de Sistemas de Inferência/2o semestre de 2008

Lembrem-se, os pontos serão assim distribuídos:

• Listas: 30%

• Trabalhos: 40%

• Provas: 30%

Aluno L1 L2 L3 L4 L5 L6 P1 P2 TP1 TP2 Soma NF Cn 1 Bernardo Cunha Vieira 4,8 5,0 5,0 5,0 5,0 5,0 14,0 15,0 20,0 20,0 98,8 99 A 2 Dereck Franckevicius Mayrink 4,5 3,5 0,0 4,5 5,0 4,8 11,5 10,9 14,0 0,0 58,7 60 D 3 Rodrigo Geraldo Ribeiro 4,8 4,3 4,3 5,0 5,0 5,0 11,0 13,2 18,0 20,0 90,6 91 A 4 Samir Araújo de Souza 4,8 4,8 4,8 5,0 5,0 5,0 13,5 14,3 20,0 20,0 97,2 98 A 5 Sérgio Mariano Dias 4,8 4,5 4,5 5,0 5,0 5,0 10,0 7,9 20,0 20,0 86,7 87 B Notas em: 5,0 5,0 5,0 5,0 5,0 5,0 15,0 15,0 20,0 20,0 100